DB.DBA.VHOST_REMOVE (
	 lhost=>':443',
	 vhost=>'ods-qa.openlinksw.com',
	 lpath=>'/webid_viewer'
);

DB.DBA.VHOST_DEFINE (
	 lhost=>':443',
	 vhost=>'ods-qa.openlinksw.com',
	 lpath=>'/webid_viewer',
	 ppath=>'/DAV/home/cblakeley/Public/webid_viewer',
	 is_dav=>1,
	 def_page=>'webid_viewer.vsp',
	 sec=>'SSL',
	 vsp_user=>'dba',
	 ses_vars=>0,
	 auth_opts=>vector ('https_cert', 'db:id_rsa', 'https_key', 'db:id_rsa', 'https_extra_chain_certificates', '', 'https_verify', 0, 'https_cv_depth', 10),
	 opts=>vector ('executable', 'yes', 'browse_sheet', ''),
	 is_default_host=>0
);